create table ACT_HI_VARINST (
    ID_ varchar(64) not null,
    PROC_INST_ID_ varchar(64),
    EXECUTION_ID_ varchar(64),
    TASK_ID_ varchar(64),
    NAME_ varchar(255) not null,
    VAR_TYPE_ varchar(100),
    REV_ integer,
    BYTEARRAY_ID_ varchar(64),
    DOUBLE_ double,
    LONG_ bigint,
    TEXT_ varchar(4000),
    TEXT2_ varchar(4000),
    primary key (ID_)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE utf8_bin;

create index ACT_IDX_HI_PROCVAR_PROC_INST on ACT_HI_VARINST(PROC_INST_ID_);
create index ACT_IDX_HI_PROCVAR_NAME_TYPE on ACT_HI_VARINST(NAME_, VAR_TYPE_);

alter table ACT_HI_ACTINST
	add TASK_ID_ varchar(64);
	
alter table ACT_HI_ACTINST
	add CALL_PROC_INST_ID_ varchar(64);

alter table ACT_HI_DETAIL
	MODIFY PROC_INST_ID_ varchar(64) null;

alter table ACT_HI_DETAIL
	MODIFY EXECUTION_ID_ varchar(64) null;
	
create index ACT_IDX_HI_ACT_INST_PROCINST on ACT_HI_ACTINST(PROC_INST_ID_, ACT_ID_);